=== Base System OpenSSH Update

Links: +
link:https://www.openssh.com/[OpenSSH] URL: link:https://www.openssh.com/[https://www.openssh.com/] +
link:https://lists.freebsd.org/pipermail/freebsd-security/2021-September/010473.html[Announcement to freebsd-security@] URL: link:https://lists.freebsd.org/pipermail/freebsd-security/2021-September/010473.html[https://lists.freebsd.org/pipermail/freebsd-security/2021-September/010473.html]

Contact: Ed Maste <emaste@freebsd.org>

OpenSSH, a suite of remote login and file transfer tools, was updated from
version 8.7p1 to 8.8p1 in the FreeBSD base system.

*NOTE*:
OpenSSH 8.8p1 disables the ssh-rsa signature scheme by default.
For more information please see the
link:https://lists.freebsd.org/pipermail/freebsd-security/2021-September/010473.html[Important
note for future FreeBSD base system OpenSSH update] mailing list post.

OpenSSH supports
link:https://en.wikipedia.org/wiki/FIDO2_Project[FIDO]/link:https://en.wikipedia.org/wiki/Universal_2nd_Factor[U2F]
devices, and support is now enabled in the base system.

Next steps include integrating U2F key devd rules into the base system,
and merging the updated OpenSSH and FIDO/U2F support to stable branches.

Sponsor: The FreeBSD Foundation
