---
title: "FreeBSD/ia64 6.1-RELEASE Hardware Notes"
sidenav: download
---

++++


<h3 class="CORPAUTHOR">The FreeBSD Documentation Project</h3>

<p class="COPYRIGHT">Copyright &copy; 2000, 2001, 2002, 2003, 2004, 2005 The FreeBSD
Documentation Project</p>

<hr />
</div>

<div class="TOC">
<dl>
<dt><b>Table of Contents</b></dt>

<dt>1 <a href="#INTRO">Introduction</a></dt>

<dt>2 <a href="#PROC-IA64">Supported Processors and Motherboards</a></dt>

<dd>
<dl>
<dt>2.1 <a href="#AEN37">Supported Devices Overview</a></dt>
</dl>
</dd>

<dt>3 <a href="#SUPPORT">Supported Devices</a></dt>

<dd>
<dl>
<dt>3.1 <a href="#DISK">Disk Controllers</a></dt>

<dt>3.2 <a href="#ETHERNET">Ethernet Interfaces</a></dt>

<dt>3.3 <a href="#TOKENRING">Token Ring Interfaces</a></dt>

<dt>3.4 <a href="#FDDI">FDDI Interfaces</a></dt>

<dt>3.5 <a href="#ATM">ATM Interfaces</a></dt>

<dt>3.6 <a href="#WLAN">Wireless Network Interfaces</a></dt>

<dt>3.7 <a href="#MISC-NETWORK">Miscellaneous Networks</a></dt>

<dt>3.8 <a href="#ISDN">ISDN Interfaces</a></dt>

<dt>3.9 <a href="#SERIAL">Serial Interfaces</a></dt>

<dt>3.10 <a href="#SOUND">Sound Devices</a></dt>

<dt>3.11 <a href="#CAMERA">Camera and Video Capture Devices</a></dt>

<dt>3.12 <a href="#USB">USB Devices</a></dt>

<dt>3.13 <a href="#FIREWIRE">IEEE 1394 (Firewire) Devices</a></dt>

<dt>3.14 <a href="#BLUETOOTH">Bluetooth Devices</a></dt>

<dt>3.15 <a href="#CRYPTO-ACCEL">Cryptographic Accelerators</a></dt>

<dt>3.16 <a href="#MISC">Miscellaneous</a></dt>
</dl>
</dd>
</dl>
</div>

<blockquote class="ABSTRACT">
<div class="ABSTRACT"><a id="AEN13" name="AEN13"></a>
<p>This is a preliminary document. It is incomplete, and in need of additional content.
Please send additional information on IA-64 processors, motherboards, and various devices
working on FreeBSD to the <a
href="http://lists.FreeBSD.org/mailman/listinfo/freebsd-ia64" target="_top">FreeBSD IA64
porting mailing list</a>.</p>
</div>
</blockquote>

<div class="SECT1">
<hr />
<h2 class="SECT1"><a id="INTRO" name="INTRO">1 Introduction</a></h2>

<p>This document contains the hardware compatibility notes for FreeBSD 6.1-RELEASE on the
IA-64 hardware platform (also referred to as FreeBSD/ia64 6.1-RELEASE). It lists devices
known to work on this platform, as well as some notes on boot-time kernel customization
that may be useful when attempting to configure support for new devices.</p>

<div class="NOTE">
<blockquote class="NOTE">
<p><b>Note:</b> This document includes information specific to the IA-64 hardware
platform. Versions of the hardware compatibility notes for other architectures will
differ in some details.</p>
</blockquote>
</div>

<p>More information on FreeBSD/ia64 is contained on the <a
href="http://www.FreeBSD.org/platforms/ia64/index.html" target="_top">FreeBSD/ia64
Project</a> page.</p>
</div>

<div class="SECT1">
<hr />
<h2 class="SECT1"><a id="PROC-IA64" name="PROC-IA64">2 Supported Processors and
Motherboards</a></h2>

<p>Currently supported processors are the <a
href="http://people.freebsd.org/~marcel/refs/ia64/itanium/24532003.pdf"
target="_top">Itanium</a> and the <a
href="http://people.freebsd.org/~marcel/refs/ia64/itanium2/25111003.pdf"
target="_top">Itanium 2</a>.</p>

<p>Supported chipsets include:</p>

<ul>
<li>
<p>HP zx1</p>
</li>

<li>
<p>Intel 460GX</p>
</li>

<li>
<p>Intel E8870</p>
</li>
</ul>

<p>Both Uniprocessor (UP) and Symmetric Multi-processor (SMP) configurations are
supported.</p>

<div class="SECT2">
<hr />
<h3 class="SECT2"><a id="AEN37" name="AEN37">2.1 Supported Devices Overview</a></h3>

<p>Most devices that can be found in or are compatible with ia64 machines are fully
supported. The notable exception is the VGA console. The FreeBSD support for VGA consoles
is at this time too much based on PC hardware and not all ia64 machines have chipsets
that provide sufficient PC legacy support. As such <a
href="http://www.FreeBSD.org/cgi/man.cgi?query=syscons&sektion=4&manpath=FreeBSD+6.1-RELEASE">
<span class="CITEREFENTRY"><span class="REFENTRYTITLE">syscons</span>(4)</span></a> can
not be enabled and the use of a serial console is required.</p>
</div>
</div>

<div class="SECT1">
<hr />
<h2 class="SECT1"><a id="SUPPORT" name="SUPPORT">3 Supported Devices</a></h2>

$FreeBSD: src/release/doc/en_US.ISO8859-1/hardware/common/dev.sgml,v 1.282.2.9.2.2
2006/05/01 08:26:00 brueffer Exp $

<p>This section describes the devices currently known to be supported by with FreeBSD on
the IA-64 platform. Other configurations may also work, but simply have not been tested
yet. Feedback, updates, and corrections to this list are encouraged.</p>

<p>Where possible, the drivers applicable to each device or class of devices is listed.
If the driver in question has a manual page in the FreeBSD base distribution (most
should), it is referenced here. Information on specific models of supported devices,
controllers, etc. can be found in the manual pages.</p>

<div class="NOTE">
<blockquote class="NOTE">
<p><b>Note:</b> The device lists in this document are being generated automatically from
FreeBSD manual pages. This means that some devices, which are supported by multiple
drivers, may appear multiple times.</p>
</blockquote>
</div>

<div class="SECT2">
<hr />
<h3 class="SECT2"><a id="DISK" name="DISK">3.1 Disk Controllers</a></h3>

<p>IDE/ATA controllers (<a
href="http://www.FreeBSD.org/cgi/man.cgi?query=ata&sektion=4&manpath=FreeBSD+6.1-RELEASE">
<span class="CITEREFENTRY"><span class="REFENTRYTITLE">ata</span>(4)</span></a>
driver)</p>

<p>Controllers supported by the <a
href="http://www.FreeBSD.org/cgi/man.cgi?query=aac&sektion=4&manpath=FreeBSD+6.1-RELEASE">
<span class="CITEREFENTRY"><span class="REFENTRYTITLE">aac</span>(4)</span></a> driver
include:</p>

<ul>
<li>
<p>Adaptec AAC-364</p>
</li>

<li>
<p>Adaptec SATA RAID 2410SA</p>
</li>

<li>
<p>Adaptec SATA RAID 2810SA</p>
</li>

<li>
<p>Adaptec SATA RAID 21610SA</p>
</li>

<li>
<p>Adaptec SCSI RAID 2120S</p>
</li>

<li>
<p>Adaptec SCSI RAID 2130S</p>
</li>

<li>
<p>Adaptec SCSI RAID 2200S</p>
</li>

<li>
<p>Adaptec SCSI RAID 2130SLP</p>
</li>

<li>
<p>Adaptec SCSI RAID 2230SLP</p>
</li>

<li>
<p>Adaptec SCSI RAID 5400S</p>
</li>

<li>
<p>Dell CERC SATA RAID 2</p>
</li>

<li>
<p>Dell PERC 2/Si</p>
</li>

<li>
<p>Dell PERC 2/QC</p>
</li>

<li>
<p>Dell PERC 3/Si</p>
</li>

<li>
<p>Dell PERC 3/Di</p>
</li>

<li>
<p>Dell PERC 320/DC</p>
</li>

<li>
<p>HP NetRAID 4M</p>
</li>
</ul>

<p>The <a
href="http://www.FreeBSD.org/cgi/man.cgi?query=ahc&sektion=4&manpath=FreeBSD+6.1-RELEASE">
<span class="CITEREFENTRY"><span class="REFENTRYTITLE">ahc</span>(4)</span></a> driver
supports the following SCSI host adapter chips and SCSI controller cards:</p>

<ul>
<li>
<p>Adaptec AIC7770 host adapter chip</p>
</li>

<li>
<p>Adaptec AIC7850 host adapter chip</p>
</li>

<li>
<p>Adaptec AIC7860 host adapter chip</p>
</li>

<li>
<p>Adaptec AIC7870 host adapter chip</p>
</li>

<li>
<p>Adaptec AIC7880 host adapter chip</p>
</li>

<li>
<p>Adaptec AIC7890 host adapter chip</p>
</li>

<li>
<p>Adaptec AIC7891 host adapter chip</p>
</li>

<li>
<p>Adaptec AIC7892 host adapter chip</p>
</li>

<li>
<p>Adaptec AIC7895 host adapter chip</p>
</li>

<li>
<p>Adaptec AIC7896 host adapter chip</p>
</li>

<li>
<p>Adaptec AIC7897 host adapter chip</p>
</li>

<li>
<p>Adaptec AIC7899 host adapter chip</p>
</li>

<li>
<p>Adaptec 274X(W)</p>
</li>

<li>
<p>Adaptec 274X(T)</p>
</li>

<li>
<p>Adaptec 284X</p>
</li>

<li>
<p>Adaptec 2910</p>
</li>

<li>
<p>Adaptec 2915</p>
</li>

<li>
<p>Adaptec 2920</p>
</li>

<li>
<p>Adaptec 2930C</p>
</li>

<li>
<p>Adaptec 2930U2</p>
</li>

<li>
<p>Adaptec 2940</p>
</li>

<li>
<p>Adaptec 2940J</p>
</li>

<li>
<p>Adaptec 2940N</p>
</li>

<li>
<p>Adaptec 2940U</p>
</li>

<li>
<p>Adaptec 2940AU</p>
</li>

<li>
<p>Adaptec 2940UW</p>
</li>

<li>
<p>Adaptec 2940UW Dual</p>
</li>

<li>
<p>Adaptec 2940UW Pro</p>
</li>

<li>
<p>Adaptec 2940U2W</p>
</li>

<li>
<p>Adaptec 2940U2B</p>
</li>

<li>
<p>Adaptec 2950U2W</p>
</li>

<li>
<p>Adaptec 2950U2B</p>
</li>

<li>
<p>Adaptec 19160B</p>
</li>

<li>
<p>Adaptec 29160B</p>
</li>

<li>
<p>Adaptec 29160N</p>
</li>

<li>
<p>Adaptec 3940</p>
</li>

<li>
<p>Adaptec 3940U</p>
</li>

<li>
<p>Adaptec 3940AU</p>
</li>

<li>
<p>Adaptec 3940UW</p>
</li>

<li>
<p>Adaptec 3940AUW</p>
</li>

<li>
<p>Adaptec 3940U2W</p>
</li>

<li>
<p>Adaptec 3950U2</p>
</li>

<li>
<p>Adaptec 3960</p>
</li>

<li>
<p>Adaptec 39160</p>
</li>

<li>
<p>Adaptec 3985</p>
</li>

<li>
<p>Adaptec 4944UW</p>
</li>

<li>
<p>NEC PC-9821Xt13 (PC-98)</p>
</li>

<li>
<p>NEC RvII26 (PC-98)</p>
</li>

<li>
<p>NEC PC-9821X-B02L/B09 (PC-98)</p>
</li>

<li>
<p>NEC SV-98/2-B03 (PC-98)</p>
</li>

<li>
<p>Many motherboards with on-board SCSI support</p>
</li>
</ul>

<p>The <a
href="http://www.FreeBSD.org/cgi/man.cgi?query=ahd&sektion=4&manpath=FreeBSD+6.1-RELEASE">
<span class="CITEREFENTRY"><span class="REFENTRYTITLE">ahd</span>(4)</span></a> driver
supports the following:</p>

<ul>
<li>
<p>Adaptec AIC7901 host adapter chip</p>
</li>

<li>
<p>Adaptec AIC7901A host adapter chip</p>
</li>

<li>
<p>Adaptec AIC7902 host adapter chip</p>
</li>

<li>
<p>Adaptec 29320 host adapter</p>
</li>

<li>
<p>Adaptec 39320 host adapter</p>
</li>

<li>
<p>Many motherboards with on-board SCSI support</p>
</li>
</ul>

<p>Controllers supported by the <a
href="http://www.FreeBSD.org/cgi/man.cgi?query=amr&sektion=4&manpath=FreeBSD+6.1-RELEASE">
<span class="CITEREFENTRY"><span class="REFENTRYTITLE">amr</span>(4)</span></a> driver
include:</p>

<ul>
<li>
<p>MegaRAID SCSI 320-1E</p>
</li>

<li>
<p>MegaRAID SCSI 320-2E</p>
</li>

<li>
<p>MegaRAID SCSI 320-4E</p>
</li>

<li>
<p>MegaRAID SCSI 320-0X</p>
</li>

<li>
<p>MegaRAID SCSI 320-2X</p>
</li>

<li>
<p>MegaRAID SCSI 320-4X</p>
</li>

<li>
<p>MegaRAID SATA 300-4X</p>
</li>

<li>
<p>MegaRAID SATA 300-8X</p>
</li>

<li>
<p>MegaRAID SATA 150-4</p>
</li>

<li>
<p>MegaRAID SATA 150-6</p>
</li>

<li>
<p>MegaRAID i4 133 RAID</p>
</li>

<li>
<p>MegaRAID SCSI 320-0</p>
</li>

<li>
<p>MegaRAID SCSI 320-1</p>
</li>

<li>
<p>MegaRAID SCSI 320-2</p>
</li>

<li>
<p>MegaRAID SCSI 320-4</p>
</li>

<li>
<p>MegaRAID Series 418</p>
</li>

<li>
<p>MegaRAID Enterprise 1200 (Series 428)</p>
</li>

<li>
<p>MegaRAID Enterprise 1300 (Series 434)</p>
</li>

<li>
<p>MegaRAID Enterprise 1400 (Series 438)</p>
</li>

<li>
<p>MegaRAID Enterprise 1500 (Series 467)</p>
</li>

<li>
<p>MegaRAID Enterprise 1600 (Series 471)</p>
</li>

<li>
<p>MegaRAID Elite 1500 (Series 467)</p>
</li>

<li>
<p>MegaRAID Elite 1600 (Series 493)</p>
</li>

<li>
<p>MegaRAID Elite 1650 (Series 4xx)</p>
</li>

<li>
<p>MegaRAID Express 100 (Series 466WS)</p>
</li>

<li>
<p>MegaRAID Express 200 (Series 466)</p>
</li>

<li>
<p>MegaRAID Express 300 (Series 490)</p>
</li>

<li>
<p>MegaRAID Express 500 (Series 475)</p>
</li>

<li>
<p>Dell PERC</p>
</li>

<li>
<p>Dell PERC 2/SC</p>
</li>

<li>
<p>Dell PERC 2/DC</p>
</li>

<li>
<p>Dell PERC 3/DCL</p>
</li>

<li>
<p>Dell PERC 3/QC</p>
</li>

<li>
<p>Dell PERC 4/DC</p>
</li>

<li>
<p>Dell PERC 4/IM</p>
</li>

<li>
<p>Dell PERC 4/SC</p>
</li>

<li>
<p>Dell PERC 4/Di</p>
</li>

<li>
<p>Dell PERC 4e/DC</p>
</li>

<li>
<p>Dell PERC 4e/Di</p>
</li>

<li>
<p>Dell PERC 4e/Si</p>
</li>

<li>
<p>Dell PERC 4ei</p>
</li>

<li>
<p>HP NetRAID-1/Si</p>
</li>

<li>
<p>HP NetRAID-3/Si (D4943A)</p>
</li>

<li>
<p>HP Embedded NetRAID</p>
</li>

<li>
<p>Intel RAID Controller SRCS16</p>
</li>

<li>
<p>Intel RAID Controller SRCU42X</p>
</li>
</ul>

<p>Controllers supported by the <a
href="http://www.FreeBSD.org/cgi/man.cgi?query=ciss&sektion=4&manpath=FreeBSD+6.1-RELEASE">
<span class="CITEREFENTRY"><span class="REFENTRYTITLE">ciss</span>(4)</span></a> driver
include:</p>

<ul>
<li>
<p>Compaq Smart Array 5300</p>
</li>

<li>
<p>Compaq Smart Array 532</p>
</li>

<li>
<p>Compaq Smart Array 5i</p>
</li>

<li>
<p>HP Smart Array 5312</p>
</li>

<li>
<p>HP Smart Array 6i</p>
</li>

<li>
<p>HP Smart Array 641</p>
</li>

<li>
<p>HP Smart Array 642</p>
</li>

<li>
<p>HP Smart Array 6400</p>
</li>

<li>
<p>HP Smart Array 6400 EM</p>
</li>

<li>
<p>HP Smart Array E400</p>
</li>

<li>
<p>HP Smart Array P600</p>
</li>

<li>
<p>HP Smart Array P800</p>
</li>

<li>
<p>HP Modular Smart Array 20 (MSA20)</p>
</li>

<li>
<p>HP Modular Smart Array 500 (MSA500)</p>
</li>
</ul>

<p>The <a
href="http://www.FreeBSD.org/cgi/man.cgi?query=dpt&sektion=4&manpath=FreeBSD+6.1-RELEASE">
<span class="CITEREFENTRY"><span class="REFENTRYTITLE">dpt</span>(4)</span></a> driver
provides support for the following RAID adapters:</p>

<ul>
<li>
<p>DPT Smart Cache Plus</p>
</li>

<li>
<p>Smart Cache II (PM2?2?, PM2022 [EISA], PM2024/PM2124 [PCI]) (Gen2)</p>
</li>

<li>
<p>Smart RAID II (PM3?2?, PM3021, PM3222)</p>
</li>

<li>
<p>Smart Cache III (PM2?3?)</p>
</li>

<li>
<p>Smart RAID III (PM3?3?, PM3332 [EISA], PM3334UW [PCI]) (Gen3)</p>
</li>

<li>
<p>Smart Cache IV (PM2?4?, PM2042 [EISA], PM2044/PM2144 [PCI]) (Gen4)</p>
</li>

<li>
<p>Smart RAID IV</p>
</li>
</ul>

<p>Controllers supported by the <a
href="http://www.FreeBSD.org/cgi/man.cgi?query=iir&sektion=4&manpath=FreeBSD+6.1-RELEASE">
<span class="CITEREFENTRY"><span class="REFENTRYTITLE">iir</span>(4)</span></a> driver
include:</p>

<ul>
<li>
<p>Intel RAID Controller SRCMR</p>
</li>

<li>
<p>Intel Server RAID Controller U3-l (SRCU31a)</p>
</li>

<li>
<p>Intel Server RAID Controller U3-1L (SRCU31La)</p>
</li>

<li>
<p>Intel Server RAID Controller U3-2 (SRCU32)</p>
</li>

<li>
<p>All past and future releases of Intel and ICP RAID Controllers.</p>
</li>
</ul>

<ul>
<li>
<p>Intel RAID Controller SRCU21 (discontinued)</p>
</li>

<li>
<p>Intel RAID Controller SRCU31 (older revision, not compatible)</p>
</li>

<li>
<p>Intel RAID Controller SRCU31L (older revision, not compatible)</p>
</li>
</ul>

<p>The SRCU31 and SRCU31L can be updated via a firmware update available from Intel.</p>

<p>Cards supported by the <a
href="http://www.FreeBSD.org/cgi/man.cgi?query=isp&sektion=4&manpath=FreeBSD+6.1-RELEASE">
<span class="CITEREFENTRY"><span class="REFENTRYTITLE">isp</span>(4)</span></a> driver
include:</p>

<ul>
<li>
<p>ISP1000</p>
</li>

<li>
<p>ISP1020</p>
</li>

<li>
<p>ISP1040</p>
</li>

<li>
<p>Qlogic 1240</p>
</li>

<li>
<p>Qlogic 1020</p>
</li>

<li>
<p>Qlogic 1040</p>
</li>

<li>
<p>Qlogic 1080</p>
</li>

<li>
<p>Qlogic 1280</p>
</li>

<li>
<p>Qlogic 12160</p>
</li>

<li>
<p>Qlogic 210X</p>
</li>

<li>
<p>Qlogic 220X</p>
</li>

<li>
<p>Qlogic 2300</p>
</li>

<li>
<p>Qlogic 2312</p>
</li>

<li>
<p>Qlogic 234X</p>
</li>

<li>
<p>Qlogic 2322</p>
</li>

<li>
<p>Qlogic 200</p>
</li>
</ul>

<p>The <a
href="http://www.FreeBSD.org/cgi/man.cgi?query=mfi&sektion=4&manpath=FreeBSD+6.1-RELEASE">
<span class="CITEREFENTRY"><span class="REFENTRYTITLE">mfi</span>(4)</span></a> driver
supports the following hardware:</p>

<ul>
<li>
<p>LSI MegaRAID SAS 8408E</p>
</li>

<li>
<p>LSI MegaRAID SAS 8480E</p>
</li>

<li>
<p>Dell PERC5/i</p>
</li>
</ul>

<p>Controllers supported by the <a
href="http://www.FreeBSD.org/cgi/man.cgi?query=mlx&sektion=4&manpath=FreeBSD+6.1-RELEASE">
<span class="CITEREFENTRY"><span class="REFENTRYTITLE">mlx</span>(4)</span></a> driver
include:</p>

<ul>
<li>
<p>Mylex DAC960P</p>
</li>

<li>
<p>Mylex DAC960PD / DEC KZPSC (Fast Wide)</p>
</li>

<li>
<p>Mylex DAC960PDU</p>
</li>

<li>
<p>Mylex DAC960PL</p>
</li>

<li>
<p>Mylex DAC960PJ</p>
</li>

<li>
<p>Mylex DAC960PG</p>
</li>

<li>
<p>Mylex DAC960PU / DEC PZPAC (Ultra Wide)</p>
</li>

<li>
<p>Mylex AcceleRAID 150 (DAC960PRL)</p>
</li>

<li>
<p>Mylex AcceleRAID 250 (DAC960PTL1)</p>
</li>

<li>
<p>Mylex eXtremeRAID 1100 (DAC1164P)</p>
</li>

<li>
<p>RAIDarray 230 controllers, aka the Ultra-SCSI DEC KZPAC-AA (1-ch, 4MB cache), KZPAC-CA
(3-ch, 4MB), KZPAC-CB (3-ch, 8MB cache)</p>
</li>
</ul>

<p>All major firmware revisions (2.x, 3.x, 4.x and 5.x) are supported, however it is
always advisable to upgrade to the most recent firmware available for the controller.
Compatible Mylex controllers not listed should work, but have not been verified.</p>

<p>Controllers supported by the <a
href="http://www.FreeBSD.org/cgi/man.cgi?query=mly&sektion=4&manpath=FreeBSD+6.1-RELEASE">
<span class="CITEREFENTRY"><span class="REFENTRYTITLE">mly</span>(4)</span></a> driver
include:</p>

<ul>
<li>
<p>Mylex AcceleRAID 160</p>
</li>

<li>
<p>Mylex AcceleRAID 170</p>
</li>

<li>
<p>Mylex AcceleRAID 352</p>
</li>

<li>
<p>Mylex eXtremeRAID 2000</p>
</li>

<li>
<p>Mylex eXtremeRAID 3000</p>
</li>
</ul>

<p>Compatible Mylex controllers not listed should work, but have not been verified.</p>

<p>The following controllers are supported by the <a
href="http://www.FreeBSD.org/cgi/man.cgi?query=mpt&sektion=4&manpath=FreeBSD+6.1-RELEASE">
<span class="CITEREFENTRY"><span class="REFENTRYTITLE">mpt</span>(4)</span></a>
driver:</p>

<ul>
<li>
<p>LSI Logic 53c1030 (Dual Ultra320 SCSI)</p>
</li>

<li>
<p>LSI Logic FC909 (1Gb/s Fibre Channel)</p>
</li>

<li>
<p>LSI Logic FC909A (Dual 1Gb/s Fibre Channel)</p>
</li>

<li>
<p>LSI Logic FC919 (2Gb/s Fibre Channel)</p>
</li>

<li>
<p>LSI Logic FC929, LSI Logic FC929X (Dual 2Gb/s Fibre Channel)</p>
</li>
</ul>

<p>The SCSI controller chips supported by the <a
href="http://www.FreeBSD.org/cgi/man.cgi?query=mpt&sektion=4&manpath=FreeBSD+6.1-RELEASE">
<span class="CITEREFENTRY"><span class="REFENTRYTITLE">mpt</span>(4)</span></a> driver
can be found onboard on many systems including:</p>

<ul>
<li>
<p>Dell PowerEdge 1750</p>
</li>

<li>
<p>IBM eServer xSeries 335</p>
</li>
</ul>

<p>The <a
href="http://www.FreeBSD.org/cgi/man.cgi?query=sym&sektion=4&manpath=FreeBSD+6.1-RELEASE">
<span class="CITEREFENTRY"><span class="REFENTRYTITLE">sym</span>(4)</span></a> driver
provides support for the following Symbios/LSI Logic PCI SCSI controllers:</p>

<ul>
<li>
<p>53C810</p>
</li>

<li>
<p>53C810A</p>
</li>

<li>
<p>53C815</p>
</li>

<li>
<p>53C825</p>
</li>

<li>
<p>53C825A</p>
</li>

<li>
<p>53C860</p>
</li>

<li>
<p>53C875</p>
</li>

<li>
<p>53C876</p>
</li>

<li>
<p>53C895</p>
</li>

<li>
<p>53C895A</p>
</li>

<li>
<p>53C896</p>
</li>

<li>
<p>53C897</p>
</li>

<li>
<p>53C1000</p>
</li>

<li>
<p>53C1000R</p>
</li>

<li>
<p>53C1010-33</p>
</li>

<li>
<p>53C1010-66</p>
</li>

<li>
<p>53C1510D</p>
</li>
</ul>

<p>The SCSI controllers supported by <a
href="http://www.FreeBSD.org/cgi/man.cgi?query=sym&sektion=4&manpath=FreeBSD+6.1-RELEASE">
<span class="CITEREFENTRY"><span class="REFENTRYTITLE">sym</span>(4)</span></a> can be
either embedded on a motherboard, or on one of the following add-on boards:</p>

<ul>
<li>
<p>ASUS SC-200, SC-896</p>
</li>

<li>
<p>Data Technology DTC3130 (all variants)</p>
</li>

<li>
<p>DawiControl DC2976UW</p>
</li>

<li>
<p>Diamond FirePort (all)</p>
</li>

<li>
<p>I-O DATA SC-UPCI (PC-98)</p>
</li>

<li>
<p>Logitec LHA-521UA (PC-98)</p>
</li>

<li>
<p>NCR cards (all)</p>
</li>

<li>
<p>Symbios cards (all)</p>
</li>

<li>
<p>Tekram DC390W, 390U, 390F, 390U2B, 390U2W, 390U3D, and 390U3W</p>
</li>

<li>
<p>Tyan S1365</p>
</li>
</ul>

<p>With all supported SCSI controllers, full support is provided for SCSI-I, SCSI-II, and
SCSI-III peripherals, including hard disks, optical disks, tape drives (including DAT,
8mm Exabyte, Mammoth, and DLT), medium changers, processor target devices and CD-ROM
drives. WORM devices that support CD-ROM commands are supported for read-only access by
the CD-ROM drivers (such as <a
href="http://www.FreeBSD.org/cgi/man.cgi?query=cd&sektion=4&manpath=FreeBSD+6.1-RELEASE"><span
 class="CITEREFENTRY"><span class="REFENTRYTITLE">cd</span>(4)</span></a>).
WORM/CD-R/CD-RW writing support is provided by <a
href="http://www.FreeBSD.org/cgi/man.cgi?query=cdrecord&sektion=1&manpath=FreeBSD+Ports"><span
 class="CITEREFENTRY"><span class="REFENTRYTITLE">cdrecord</span>(1)</span></a>, which is
a part of the <a
href="http://www.FreeBSD.org/cgi/url.cgi?ports/sysutils/cdrtools/pkg-descr"><tt
class="FILENAME">sysutils/cdrtools</tt></a> port in the Ports Collection.</p>

<p>The following CD-ROM type systems are supported at this time:</p>

<ul>
<li>
<p>SCSI interface (also includes ProAudio Spectrum and SoundBlaster SCSI) (<a
href="http://www.FreeBSD.org/cgi/man.cgi?query=cd&sektion=4&manpath=FreeBSD+6.1-RELEASE"><span
 class="CITEREFENTRY"><span class="REFENTRYTITLE">cd</span>(4)</span></a>)</p>
</li>

<li>
<p>ATAPI IDE interface (<a
href="http://www.FreeBSD.org/cgi/man.cgi?query=acd&sektion=4&manpath=FreeBSD+6.1-RELEASE">
<span class="CITEREFENTRY"><span class="REFENTRYTITLE">acd</span>(4)</span></a>)</p>
</li>
</ul>

<br />
<br />
</div>

<div class="SECT2">
<hr />
<h3 class="SECT2"><a id="ETHERNET" name="ETHERNET">3.2 Ethernet Interfaces</a></h3>

<p>Adapters supported by the <a
href="http://www.FreeBSD.org/cgi/man.cgi?query=aue&sektion=4&manpath=FreeBSD+6.1-RELEASE">
<span class="CITEREFENTRY"><span class="REFENTRYTITLE">aue</span>(4)</span></a> driver
include:</p>

<ul>
<li>
<p>Abocom UFE1000, DSB650TX_NA</p>
</li>

<li>
<p>Accton USB320-EC, SpeedStream</p>
</li>

<li>
<p>ADMtek AN986, AN8511</p>
</li>

<li>
<p>Billionton USB100, USB100LP, USB100EL, USBE100</p>
</li>

<li>
<p>Corega Ether FEther USB-T, FEther USB-TX, FEther USB-TXS</p>
</li>

<li>
<p>D-Link DSB-650, DSB-650TX, DSB-650TX-PNA</p>
</li>

<li>
<p>Elecom LD-USBL/TX</p>
</li>

<li>
<p>Elsa Microlink USB2Ethernet</p>
</li>

<li>
<p>HP hn210e</p>
</li>

<li>
<p>I-O Data USB ETTX</p>
</li>

<li>
<p>Kingston KNU101TX</p>
</li>

<li>
<p>LinkSys USB10T adapters that contain the AN986 Pegasus chipset, USB10TA, USB10TX,
USB100TX, USB100H1</p>
</li>

<li>
<p>MELCO LUA-TX, LUA2-TX</p>
</li>

<li>
<p>Planex UE-200TX</p>
</li>

<li>
<p>Sandberg USB to Network Link (model number 133-06)</p>
</li>

<li>
<p>Siemens Speedstream</p>
</li>

<li>
<p>SmartBridges smartNIC</p>
</li>

<li>
<p>SMC 2202USB</p>
</li>

<li>
<p>SOHOware NUB100</p>
</li>
</ul>

<p>The <a
href="http://www.FreeBSD.org/cgi/man.cgi?query=bge&sektion=4&manpath=FreeBSD+6.1-RELEASE">
<span class="CITEREFENTRY"><span class="REFENTRYTITLE">bge</span>(4)</span></a> driver
provides support for various NICs based on the Broadcom BCM570x family of Gigabit
Ethernet controller chips, including the following:</p>

<ul>
<li>
<p>3Com 3c996-T (10/100/1000baseTX)</p>
</li>

<li>
<p>Dell PowerEdge 1750 integrated BCM5704C NIC (10/100/1000baseTX)</p>
</li>

<li>
<p>Dell PowerEdge 2550 integrated BCM5700 NIC (10/100/1000baseTX)</p>
</li>

<li>
<p>Dell PowerEdge 2650 integrated BCM5703 NIC (10/100/1000baseTX)</p>
</li>

<li>
<p>IBM x235 server integrated BCM5703x NIC (10/100/1000baseTX)</p>
</li>

<li>
<p>HP Compaq dc7600 integrated BCM5752 NIC (10/100/1000baseTX)</p>
</li>

<li>
<p>HP ProLiant NC7760 embedded Gigabit NIC (10/100/1000baseTX)</p>
</li>

<li>
<p>HP ProLiant NC7770 PCI-X Gigabit NIC (10/100/1000baseTX)</p>
</li>

<li>
<p>HP ProLiant NC7781 embedded PCI-X Gigabit NIC (10/100/1000baseTX)</p>
</li>

<li>
<p>Netgear GA302T (10/100/1000baseTX)</p>
</li>

<li>
<p>SysKonnect SK-9D21 (10/100/1000baseTX)</p>
</li>

<li>
<p>SysKonnect SK-9D41 (1000baseSX)</p>
</li>
</ul>

<p>The <a
href="http://www.FreeBSD.org/cgi/man.cgi?query=cue&sektion=4&manpath=FreeBSD+6.1-RELEASE">
<span class="CITEREFENTRY"><span class="REFENTRYTITLE">cue</span>(4)</span></a> driver
supports CATC USB-EL1210A based USB Ethernet adapters including:</p>

<ul>
<li>
<p>Belkin F5U011/F5U111</p>
</li>

<li>
<p>CATC Netmate</p>
</li>

<li>
<p>CATC Netmate II</p>
</li>

<li>
<p>SmartBridges SmartLink</p>
</li>
</ul>

<p>The <a
href="http://www.FreeBSD.org/cgi/man.cgi?query=dc&sektion=4&manpath=FreeBSD+6.1-RELEASE"><span
 class="CITEREFENTRY"><span class="REFENTRYTITLE">dc</span>(4)</span></a> driver provides
support for the following chipsets:</p>

<ul>
<li>
<p>DEC/Intel 21143</p>
</li>

<li>
<p>ADMtek AL981 Comet, AN985 Centaur, ADM9511 Centaur II and ADM9513 Centaur II</p>
</li>

<li>
<p>ASIX Electronics AX88140A and AX88141</p>
</li>

<li>
<p>Conexant LANfinity RS7112 (miniPCI)</p>
</li>

<li>
<p>Davicom DM9009, DM9100, DM9102 and DM9102A</p>
</li>

<li>
<p>Lite-On 82c168 and 82c169 PNIC</p>
</li>

<li>
<p>Lite-On/Macronix 82c115 PNIC II</p>
</li>

<li>
<p>Macronix 98713, 98713A, 98715, 98715A, 98715AEC-C, 98725, 98727 and 98732</p>
</li>

<li>
<p>Xircom X3201 (cardbus only)</p>
</li>
</ul>

<p>The following NICs are known to work with the <a
href="http://www.FreeBSD.org/cgi/man.cgi?query=dc&sektion=4&manpath=FreeBSD+6.1-RELEASE"><span
 class="CITEREFENTRY"><span class="REFENTRYTITLE">dc</span>(4)</span></a> driver at this
time:</p>

<ul>
<li>
<p>3Com OfficeConnect 10/100B (ADMtek AN985 Centaur-P)</p>
</li>

<li>
<p>Abocom FE2500</p>
</li>

<li>
<p>Accton EN1217 (98715A)</p>
</li>

<li>
<p>Accton EN2242 MiniPCI</p>
</li>

<li>
<p>Adico AE310TX (98715A)</p>
</li>

<li>
<p>Alfa Inc GFC2204 (ASIX AX88140A)</p>
</li>

<li>
<p>Built in 10Mbps only Ethernet on Compaq Presario 7900 series desktops (21143,
non-MII)</p>
</li>

<li>
<p>Built in DE500-BA on DEC Alpha workstations (21143, non-MII)</p>
</li>

<li>
<p>Built in Sun DMFE 10/100 Mbps Ethernet on Sun Netra X1 and Sun Fire V100 (DM9102A,
MII)</p>
</li>

<li>
<p>Built in Ethernet on LinkSys EtherFast 10/100 Instant GigaDrive (DM9102, MII)</p>
</li>

<li>
<p>CNet Pro110B (ASIX AX88140A)</p>
</li>

<li>
<p>CNet Pro120A (98715A or 98713A) and CNet Pro120B (98715)</p>
</li>

<li>
<p>Compex RL100-TX (98713 or 98713A)</p>
</li>

<li>
<p>D-Link DFE-570TX (21143, MII, quad port)</p>
</li>

<li>
<p>Digital DE500-BA 10/100 (21143, non-MII)</p>
</li>

<li>
<p>ELECOM Laneed LD-CBL/TXA (ADMtek AN985)</p>
</li>

<li>
<p>Hawking CB102 CardBus</p>
</li>

<li>
<p>IBM EtherJet Cardbus Adapter</p>
</li>

<li>
<p>Intel PRO/100 Mobile Cardbus (versions that use the X3201 chipset)</p>
</li>

<li>
<p>Jaton XpressNet (Davicom DM9102)</p>
</li>

<li>
<p>Kingston KNE100TX (21143, MII)</p>
</li>

<li>
<p>Kingston KNE110TX (PNIC 82c169)</p>
</li>

<li>
<p>LinkSys LNE100TX (PNIC 82c168, 82c169)</p>
</li>

<li>
<p>LinkSys LNE100TX v2.0 (PNIC II 82c115)</p>
</li>

<li>
<p>LinkSys LNE100TX v4.0/4.1 (ADMtek AN985 Centaur-P)</p>
</li>

<li>
<p>Matrox FastNIC 10/100 (PNIC 82c168, 82c169)</p>
</li>

<li>
<p>Melco LGY-PCI-TXL</p>
</li>

<li>
<p>Microsoft MN-120 10/100 CardBus (ADMTek Centaur-C)</p>
</li>

<li>
<p>Microsoft MN-130 10/100 PCI (ADMTek Centaur-P)</p>
</li>

<li>
<p>NDC SOHOware SFA110A (98713A)</p>
</li>

<li>
<p>NDC SOHOware SFA110A Rev B4 (98715AEC-C)</p>
</li>

<li>
<p>NetGear FA310-TX Rev. D1, D2 or D3 (PNIC 82c169)</p>
</li>

<li>
<p>Netgear FA511</p>
</li>

<li>
<p>PlaneX FNW-3602-T (ADMtek AN985)</p>
</li>

<li>
<p>SMC EZ Card 10/100 1233A-TX (ADMtek AN985)</p>
</li>

<li>
<p>SVEC PN102-TX (98713)</p>
</li>

<li>
<p>Xircom Cardbus Realport</p>
</li>

<li>
<p>Xircom Cardbus Ethernet 10/100</p>
</li>

<li>
<p>Xircom Cardbus Ethernet II 10/100</p>
</li>
</ul>

<p>Adapters supported by the <a
href="http://www.FreeBSD.org/cgi/man.cgi?query=de&sektion=4&manpath=FreeBSD+6.1-RELEASE"><span
 class="CITEREFENTRY"><span class="REFENTRYTITLE">de</span>(4)</span></a> driver
include:</p>

<ul>
<li>
<p>Adaptec ANA-6944/TX</p>
</li>

<li>
<p>Cogent EM100FX and EM440TX</p>
</li>

<li>
<p>Corega FastEther PCI-TX</p>
</li>

<li>
<p>D-Link DFE-500TX</p>
</li>

<li>
<p>DEC DE435, DEC DE450, and DEC DE500</p>
</li>

<li>
<p>ELECOM LD-PCI2T, LD-PCITS</p>
</li>

<li>
<p>I-O DATA LA2/T-PCI</p>
</li>

<li>
<p>SMC Etherpower 8432, 9332 and 9334</p>
</li>

<li>
<p>ZNYX ZX3xx</p>
</li>
</ul>

<p>The <a
href="http://www.FreeBSD.org/cgi/man.cgi?query=em&sektion=4&manpath=FreeBSD+6.1-RELEASE"><span
 class="CITEREFENTRY"><span class="REFENTRYTITLE">em</span>(4)</span></a> driver supports
Gigabit Ethernet adapters based on the Intel 82540, 82541ER, 82541PI, 82542, 82543,
82544, 82545, 82546, 82546EB, 82546GB, 82547, 82571, 82572 and 82573 controller
chips:</p>

<ul>
<li>
<p>Intel PRO/1000 CT Network Connection (82547)</p>
</li>

<li>
<p>Intel PRO/1000 F Server Adapter (82543)</p>
</li>

<li>
<p>Intel PRO/1000 Gigabit Server Adapter (82542)</p>
</li>

<li>
<p>Intel PRO/1000 GT Desktop Adapter (82541PI)</p>
</li>

<li>
<p>Intel PRO/1000 MF Dual Port Server Adapter (82546)</p>
</li>

<li>
<p>Intel PRO/1000 MF Server Adapter (82545)</p>
</li>

<li>
<p>Intel PRO/1000 MF Server Adapter (LX) (82545)</p>
</li>

<li>
<p>Intel PRO/1000 MT Desktop Adapter (82540)</p>
</li>

<li>
<p>Intel PRO/1000 MT Desktop Adapter (82541)</p>
</li>

<li>
<p>Intel PRO/1000 MT Dual Port Server Adapter (82546)</p>
</li>

<li>
<p>Intel PRO/1000 MT Quad Port Server Adapter (82546EB)</p>
</li>

<li>
<p>Intel PRO/1000 MT Server Adapter (82545)</p>
</li>

<li>
<p>Intel PRO/1000 T Desktop Adapter (82544)</p>
</li>

<li>
<p>Intel PRO/1000 T Server Adapter (82543)</p>
</li>

<li>
<p>Intel PRO/1000 XF Server Adapter (82544)</p>
</li>

<li>
<p>Intel PRO/1000 XT Server Adapter (82544)</p>
</li>
</ul>

<p>Adapters supported by the <a
href="http://www.FreeBSD.org/cgi/man.cgi?query=fxp&sektion=4&manpath=FreeBSD+6.1-RELEASE">
<span class="CITEREFENTRY"><span class="REFENTRYTITLE">fxp</span>(4)</span></a> driver
include:</p>

<ul>
<li>
<p>Intel EtherExpress PRO/10</p>
</li>

<li>
<p>Intel InBusiness 10/100</p>
</li>

<li>
<p>Intel PRO/100B / EtherExpressPRO/100 B PCI Adapter</p>
</li>

<li>
<p>Intel PRO/100+ Management Adapter</p>
</li>

<li>
<p>Intel PRO/100 VE Desktop Adapter</p>
</li>

<li>
<p>Intel PRO/100 M Desktop Adapter</p>
</li>

<li>
<p>Intel PRO/100 S Desktop, Server and Dual-Port Server Adapters</p>
</li>

<li>
<p>Contec C-NET(PI)-100TX (PC-98)</p>
</li>

<li>
<p>NEC PC-9821Ra20, Rv20, Xv13, Xv20 internal 100Base-TX (PC-98)</p>
</li>

<li>
<p>NEC PC-9821X-B06 (PC-98)</p>
</li>

<li>
<p>Many on-board network interfaces on Intel motherboards</p>
</li>
</ul>

<p>The <a
href="http://www.FreeBSD.org/cgi/man.cgi?query=hme&sektion=4&manpath=FreeBSD+6.1-RELEASE">
<span class="CITEREFENTRY"><span class="REFENTRYTITLE">hme</span>(4)</span></a> driver
supports the on-board Ethernet interfaces of many Sun UltraSPARC workstation and server
models. Cards supported by the <a
href="http://www.FreeBSD.org/cgi/man.cgi?query=hme&sektion=4&manpath=FreeBSD+6.1-RELEASE">
<span class="CITEREFENTRY"><span class="REFENTRYTITLE">hme</span>(4)</span></a> driver
include:</p>

<ul>
<li>
<p>Sun PCI SunSwift Adapter</p>
</li>

<li>
<p>Sun SBus SunSwift Adapter &#8220;( hme&#8221; and &#8220;SUNW,hme&#8221;)</p>
</li>

<li>
<p>Sun PCI Sun100BaseT Adapter 2.0</p>
</li>

<li>
<p>Sun SBus Sun100BaseT 2.0</p>
</li>

<li>
<p>Sun PCI Quad FastEthernet Controller</p>
</li>

<li>
<p>Sun SBus Quad FastEthernet Controller</p>
</li>
</ul>

<p>The <a
href="http://www.FreeBSD.org/cgi/man.cgi?query=kue&sektion=4&manpath=FreeBSD+6.1-RELEASE">
<span class="CITEREFENTRY"><span class="REFENTRYTITLE">kue</span>(4)</span></a> driver
supports Kawasaki LSI KL5KLUSB101B based USB Ethernet adapters including:</p>

<ul>
<li>
<p>3Com 3c19250</p>
</li>

<li>
<p>3Com 3c460 HomeConnect Ethernet USB Adapter</p>
</li>

<li>
<p>ADS Technologies USB-10BT</p>
</li>

<li>
<p>AOX USB101</p>
</li>

<li>
<p>ATen UC10T</p>
</li>

<li>
<p>Abocom URE 450</p>
</li>

<li>
<p>Corega USB-T</p>
</li>

<li>
<p>D-Link DSB-650C</p>
</li>

<li>
<p>Entrega NET-USB-E45, NET-HUB-3U1E</p>
</li>

<li>
<p>I/O Data USB ETT</p>
</li>

<li>
<p>Kawasaki DU-H3E</p>
</li>

<li>
<p>LinkSys USB10T</p>
</li>

<li>
<p>Netgear EA101</p>
</li>

<li>
<p>Peracom USB Ethernet Adapter</p>
</li>

<li>
<p>SMC 2102USB, 2104USB</p>
</li>
</ul>

<p>The <a
href="http://www.FreeBSD.org/cgi/man.cgi?query=pcn&sektion=4&manpath=FreeBSD+6.1-RELEASE">
<span class="CITEREFENTRY"><span class="REFENTRYTITLE">pcn</span>(4)</span></a> driver
supports adapters and embedded controllers based on the AMD PCnet/FAST, PCnet/FAST+,
PCnet/FAST III, PCnet/PRO and PCnet/Home Fast Ethernet chips:</p>

<ul>
<li>
<p>AMD Am79C971 PCnet-FAST</p>
</li>

<li>
<p>AMD Am79C972 PCnet-FAST+</p>
</li>

<li>
<p>AMD Am79C973/Am79C975 PCnet-FAST III</p>
</li>

<li>
<p>AMD Am79C976 PCnet-PRO</p>
</li>

<li>
<p>AMD Am79C978 PCnet-Home</p>
</li>

<li>
<p>Allied-Telesis LA-PCI</p>
</li>

<li>
<p>NEC SV-98/2-B05, B06</p>
</li>
</ul>

<p>The <a
href="http://www.FreeBSD.org/cgi/man.cgi?query=re&sektion=4&manpath=FreeBSD+6.1-RELEASE"><span
 class="CITEREFENTRY"><span class="REFENTRYTITLE">re</span>(4)</span></a> driver supports
RealTek RTL8139C+, RTL8169, RTL8169S and RTL8110S based Fast Ethernet and Gigabit
Ethernet adapters including:</p>

<ul>
<li>
<p>Alloy Computer Products EtherGOLD 1439E 10/100 (8139C+)</p>
</li>

<li>
<p>Compaq Evo N1015v Integrated Ethernet (8139C+)</p>
</li>

<li>
<p>Corega CG-LAPCIGT Gigabit Ethernet (8169S)</p>
</li>

<li>
<p>D-Link DGE-528(T) Gigabit Ethernet (8169S)</p>
</li>

<li>
<p>Gigabyte 7N400 Pro2 Integrated Gigabit Ethernet (8110S)</p>
</li>

<li>
<p>LevelOne GNC-0105T (8169S)</p>
</li>

<li>
<p>PLANEX COMMUNICATIONS Inc. GN-1200TC (8169S)</p>
</li>

<li>
<p>Xterasys XN-152 10/100/1000 NIC (8169)</p>
</li>
</ul>

<p>Adapters supported by the <a
href="http://www.FreeBSD.org/cgi/man.cgi?query=rl&sektion=4&manpath=FreeBSD+6.1-RELEASE"><span
 class="CITEREFENTRY"><span class="REFENTRYTITLE">rl</span>(4)</span></a> driver
include:</p>

<ul>
<li>
<p>Accton &#8220;Cheetah&#8221; EN1207D (MPX 5030/5038; RealTek 8139 clone)</p>
</li>

<li>
<p>Allied Telesyn AT2550</p>
</li>

<li>
<p>Allied Telesyn AT2500TX</p>
</li>

<li>
<p>Belkin F5D5000</p>
</li>

<li>
<p>BUFFALO (Melco INC.) LPC-CB-CLX (CardBus)</p>
</li>

<li>
<p>Compaq HNE-300</p>
</li>

<li>
<p>CompUSA no-name 10/100 PCI Ethernet NIC</p>
</li>

<li>
<p>Corega FEther CB-TXD</p>
</li>

<li>
<p>Corega FEtherII CB-TXD</p>
</li>

<li>
<p>D-Link DFE-528TX</p>
</li>

<li>
<p>D-Link DFE-530TX+</p>
</li>

<li>
<p>D-Link DFE-538TX</p>
</li>

<li>
<p>D-Link DFE-690TXD</p>
</li>

<li>
<p>Edimax EP-4103DL CardBus</p>
</li>

<li>
<p>Encore ENL832-TX 10/100 M PCI</p>
</li>

<li>
<p>Farallon NetLINE 10/100 PCI</p>
</li>

<li>
<p>Genius GF100TXR</p>
</li>

<li>
<p>GigaFast Ethernet EE100-AXP</p>
</li>

<li>
<p>KTX-9130TX 10/100 Fast Ethernet</p>
</li>

<li>
<p>LevelOne FPC-0106TX</p>
</li>

<li>
<p>Longshine LCS-8038TX-R</p>
</li>

<li>
<p>NDC Communications NE100TX-E</p>
</li>

<li>
<p>Netronix Inc. EA-1210 NetEther 10/100</p>
</li>

<li>
<p>Nortel Networks 10/100BaseTX</p>
</li>

<li>
<p>OvisLink LEF-8129TX</p>
</li>

<li>
<p>OvisLink LEF-8139TX</p>
</li>

<li>
<p>Peppercon AG ROL-F</p>
</li>

<li>
<p>Planex FNW-3800-TX</p>
</li>

<li>
<p>SMC EZ Card 10/100 PCI 1211-TX</p>
</li>

<li>
<p>SOHO (PRAGMATIC) UE-1211C</p>
</li>
</ul>

<p>Adapters supported by the <a
href="http://www.FreeBSD.org/cgi/man.cgi?query=sf&sektion=4&manpath=FreeBSD+6.1-RELEASE"><span
 class="CITEREFENTRY"><span class="REFENTRYTITLE">sf</span>(4)</span></a> driver
include:</p>

<ul>
<li>
<p>ANA-62011 64-bit single port 10/100baseTX adapter</p>
</li>

<li>
<p>ANA-62022 64-bit dual port 10/100baseTX adapter</p>
</li>

<li>
<p>ANA-62044 64-bit quad port 10/100baseTX adapter</p>
</li>

<li>
<p>ANA-69011 32-bit single port 10/100baseTX adapter</p>
</li>

<li>
<p>ANA-62020 64-bit single port 100baseFX adapter</p>
</li>
</ul>

<p>The <a
href="http://www.FreeBSD.org/cgi/man.cgi?query=sis&sektion=4&manpath=FreeBSD+6.1-RELEASE">
<span class="CITEREFENTRY"><span class="REFENTRYTITLE">sis</span>(4)</span></a> driver
supports Silicon Integrated Systems SiS 900 and SiS 7016 based Fast Ethernet adapters and
embedded controllers, as well as Fast Ethernet adapters based on the National
Semiconductor DP83815 (MacPhyter) chip. Supported adapters include:</p>

<ul>
<li>
<p>@Nifty FNECHARD IFC USUP-TX</p>
</li>

<li>
<p>MELCO LGY-PCI-TXC</p>
</li>

<li>
<p>Netgear FA311-TX (DP83815)</p>
</li>

<li>
<p>Netgear FA312-TX (DP83815)</p>
</li>

<li>
<p>SiS 630, 635, and 735 motherboard chipsets</p>
</li>
</ul>

<p>The <a
href="http://www.FreeBSD.org/cgi/man.cgi?query=txp&sektion=4&manpath=FreeBSD+6.1-RELEASE">
<span class="CITEREFENTRY"><span class="REFENTRYTITLE">txp</span>(4)</span></a> driver
supports the following cards:</p>

<ul>
<li>
<p>3Com 3CR990-TX-95</p>
</li>

<li>
<p>3Com 3CR990-TX-97</p>
</li>

<li>
<p>3Com 3cR990B-TXM</p>
</li>

<li>
<p>3Com 3CR990SVR95</p>
</li>

<li>
<p>3Com 3CR990SVR97</p>
</li>

<li>
<p>3Com 3cR990B-SRV</p>
</li>
</ul>

<p>The <a
href="http://www.FreeBSD.org/cgi/man.cgi?query=vx&sektion=4&manpath=FreeBSD+6.1-RELEASE"><span
 class="CITEREFENTRY"><span class="REFENTRYTITLE">vx</span>(4)</span></a> driver supports
the following cards:</p>

<ul>
<li>
<p>3Com 3c590 EtherLink III PCI</p>
</li>

<li>
<p>3Com 3c592 EtherLink III EISA</p>
</li>

<li>
<p>3Com 3c595 Fast EtherLink III PCI in 10 Mbps mode</p>
</li>

<li>
<p>3Com 3c597 Fast EtherLink III EISA in 10 Mbps mode</p>
</li>
</ul>

<p>The <a
href="http://www.FreeBSD.org/cgi/man.cgi?query=xl&sektion=4&manpath=FreeBSD+6.1-RELEASE"><span
 class="CITEREFENTRY"><span class="REFENTRYTITLE">xl</span>(4)</span></a> driver supports
the following hardware:</p>

<ul>
<li>
<p>3Com 3c900-TPO</p>
</li>

<li>
<p>3Com 3c900-COMBO</p>
</li>

<li>
<p>3Com 3c905-TX</p>
</li>

<li>
<p>3Com 3c905-T4</p>
</li>

<li>
<p>3Com 3c900B-TPO</p>
</li>

<li>
<p>3Com 3c900B-TPC</p>
</li>

<li>
<p>3Com 3c900B-FL</p>
</li>

<li>
<p>3Com 3c900B-COMBO</p>
</li>

<li>
<p>3Com 3c905B-T4</p>
</li>

<li>
<p>3Com 3c905B-TX</p>
</li>

<li>
<p>3Com 3c905B-FX</p>
</li>

<li>
<p>3Com 3c905B-COMBO</p>
</li>

<li>
<p>3Com 3c905C-TX</p>
</li>

<li>
<p>3Com 3c980, 3c980B, and 3c980C server adapters</p>
</li>

<li>
<p>3Com 3cSOHO100-TX OfficeConnect adapters</p>
</li>

<li>
<p>3Com 3c450 HomeConnect adapters</p>
</li>

<li>
<p>3Com 3c555, 3c556 and 3c556B mini-PCI adapters</p>
</li>

<li>
<p>3Com 3C3SH573BT, 3C575TX, 3CCFE575BT, 3CXFE575BT, 3CCFE575CT, 3CXFE575CT, 3CCFEM656,
3CCFEM656B, and 3CCFEM656C, 3CXFEM656, 3CXFEM656B, and 3CXFEM656C CardBus adapters</p>
</li>

<li>
<p>3Com 3c905-TX, 3c905B-TX 3c905C-TX, 3c920B-EMB, and 3c920B-EMB-WNM embedded
adapters</p>
</li>
</ul>

<p>Both the 3C656 family of CardBus cards and the 3C556 family of MiniPCI cards have a
built-in proprietary modem. Neither the <a
href="http://www.FreeBSD.org/cgi/man.cgi?query=xl&sektion=4&manpath=FreeBSD+6.1-RELEASE"><span
 class="CITEREFENTRY"><span class="REFENTRYTITLE">xl</span>(4)</span></a> driver nor any
other driver supports this modem.</p>
</div>

<div class="SECT2">
<hr />
<h3 class="SECT2"><a id="TOKENRING" name="TOKENRING">3.3 Token Ring Interfaces</a></h3>
</div>

<div class="SECT2">
<hr />
<h3 class="SECT2"><a id="FDDI" name="FDDI">3.4 FDDI Interfaces</a></h3>
</div>

<div class="SECT2">
<hr />
<h3 class="SECT2"><a id="ATM" name="ATM">3.5 ATM Interfaces</a></h3>
</div>

<div class="SECT2">
<hr />
<h3 class="SECT2"><a id="WLAN" name="WLAN">3.6 Wireless Network Interfaces</a></h3>
</div>

<div class="SECT2">
<hr />
<h3 class="SECT2"><a id="MISC-NETWORK" name="MISC-NETWORK">3.7 Miscellaneous
Networks</a></h3>
</div>

<div class="SECT2">
<hr />
<h3 class="SECT2"><a id="ISDN" name="ISDN">3.8 ISDN Interfaces</a></h3>
</div>

<div class="SECT2">
<hr />
<h3 class="SECT2"><a id="SERIAL" name="SERIAL">3.9 Serial Interfaces</a></h3>

<p>The <a
href="http://www.FreeBSD.org/cgi/man.cgi?query=uart&sektion=4&manpath=FreeBSD+6.1-RELEASE">
<span class="CITEREFENTRY"><span class="REFENTRYTITLE">uart</span>(4)</span></a> driver
supports the following classes of UARTs:</p>

<ul>
<li>
<p>NS8250: standard hardware based on the 8250, 16450, 16550, 16650, 16750 or the 16950
UARTs</p>
</li>

<li>
<p>SAB82532: Siemens SAB 82532 based serial communications controllers in asynchronuous
mode.</p>
</li>

<li>
<p>Z8530: Zilog 8530 based serial communications controllers in asynchronuous mode.</p>
</li>
</ul>

<p>PCI-Based multi-port serial boards (<a
href="http://www.FreeBSD.org/cgi/man.cgi?query=puc&sektion=4&manpath=FreeBSD+6.1-RELEASE">
<span class="CITEREFENTRY"><span class="REFENTRYTITLE">puc</span>(4)</span></a>
driver)</p>

<ul>
<li>
<p>Diva Serial (GSP) Multiport UART</p>
</li>
</ul>

<br />
<br />
</div>

<div class="SECT2">
<hr />
<h3 class="SECT2"><a id="SOUND" name="SOUND">3.10 Sound Devices</a></h3>
</div>

<div class="SECT2">
<hr />
<h3 class="SECT2"><a id="CAMERA" name="CAMERA">3.11 Camera and Video Capture
Devices</a></h3>
</div>

<div class="SECT2">
<hr />
<h3 class="SECT2"><a id="USB" name="USB">3.12 USB Devices</a></h3>

<p>A range of USB peripherals are supported; devices known to work are listed in this
section. Owing to the generic nature of most USB devices, with some exceptions any device
of a given class will be supported, even if not explicitly listed here.</p>

<div class="NOTE">
<blockquote class="NOTE">
<p><b>Note:</b> USB Ethernet adapters can be found in the section listing <a
href="#ETHERNET">Ethernet interfaces</a>.</p>
</blockquote>
</div>

<div class="NOTE">
<blockquote class="NOTE">
<p><b>Note:</b> USB Bluetooth adapters can be found in <a href="#BLUETOOTH">Bluetooth</a>
section.</p>
</blockquote>
</div>

<p>The <a
href="http://www.FreeBSD.org/cgi/man.cgi?query=ohci&sektion=4&manpath=FreeBSD+6.1-RELEASE">
<span class="CITEREFENTRY"><span class="REFENTRYTITLE">ohci</span>(4)</span></a> driver
supports all OHCI v1.0 compliant controllers including:</p>

<ul>
<li>
<p>AcerLabs M5237 (Aladdin-V)</p>
</li>

<li>
<p>AMD-756</p>
</li>

<li>
<p>OPTi 82C861 (FireLink)</p>
</li>

<li>
<p>NEC uPD 9210</p>
</li>

<li>
<p>CMD Tech 670 (USB0670)</p>
</li>

<li>
<p>CMD Tech 673 (USB0673)</p>
</li>

<li>
<p>NVIDIA nForce3</p>
</li>

<li>
<p>Sun PCIO-2 (RIO USB)</p>
</li>
</ul>

<p>The <a
href="http://www.FreeBSD.org/cgi/man.cgi?query=uhci&sektion=4&manpath=FreeBSD+6.1-RELEASE">
<span class="CITEREFENTRY"><span class="REFENTRYTITLE">uhci</span>(4)</span></a> driver
supports all UHCI v1.1 compliant controllers including:</p>

<ul>
<li>
<p>Intel 82371AB/EB (PIIX4)</p>
</li>

<li>
<p>Intel 82371SB (PIIX3)</p>
</li>

<li>
<p>VIA 83C572</p>
</li>
</ul>

<p>USB 2.0 controllers using the EHCI interface (<a
href="http://www.FreeBSD.org/cgi/man.cgi?query=ehci&sektion=4&manpath=FreeBSD+6.1-RELEASE">
<span class="CITEREFENTRY"><span class="REFENTRYTITLE">ehci</span>(4)</span></a>
driver)</p>

<p>Hubs</p>

<p>Keyboards (<a
href="http://www.FreeBSD.org/cgi/man.cgi?query=ukbd&sektion=4&manpath=FreeBSD+6.1-RELEASE">
<span class="CITEREFENTRY"><span class="REFENTRYTITLE">ukbd</span>(4)</span></a>
driver)</p>

<p>Mice (<a
href="http://www.FreeBSD.org/cgi/man.cgi?query=ums&sektion=4&manpath=FreeBSD+6.1-RELEASE">
<span class="CITEREFENTRY"><span class="REFENTRYTITLE">ums</span>(4)</span></a>
driver)</p>

<p>The <a
href="http://www.FreeBSD.org/cgi/man.cgi?query=umct&sektion=4&manpath=FreeBSD+6.1-RELEASE">
<span class="CITEREFENTRY"><span class="REFENTRYTITLE">umct</span>(4)</span></a> driver
supports the following adapters:</p>

<ul>
<li>
<p>Belkin F5U109</p>
</li>

<li>
<p>Belkin F5U409</p>
</li>

<li>
<p>D-Link DU-H3SP USB BAY Hub</p>
</li>

<li>
<p>Magic Control Technology USB-232</p>
</li>

<li>
<p>Sitecom USB-232</p>
</li>
</ul>
</div>

<div class="SECT2">
<hr />
<h3 class="SECT2"><a id="FIREWIRE" name="FIREWIRE">3.13 IEEE 1394 (Firewire)
Devices</a></h3>

<p>The <a
href="http://www.FreeBSD.org/cgi/man.cgi?query=fwohci&sektion=4&manpath=FreeBSD+6.1-RELEASE">
<span class="CITEREFENTRY"><span class="REFENTRYTITLE">fwohci</span>(4)</span></a> driver
provides support for PCI/CardBus FireWire interface cards. The driver supports the
following IEEE 1394 OHCI chipsets:</p>

<ul>
<li>
<p>Adaptec AHA-894x/AIC-5800</p>
</li>

<li>
<p>Apple Pangea</p>
</li>

<li>
<p>Apple UniNorth</p>
</li>

<li>
<p>Intel 82372FB</p>
</li>

<li>
<p>IOGEAR GUF320</p>
</li>

<li>
<p>Lucent / Agere FW322/323</p>
</li>

<li>
<p>NEC uPD72861</p>
</li>

<li>
<p>NEC uPD72870</p>
</li>

<li>
<p>NEC uPD72871/2</p>
</li>

<li>
<p>NEC uPD72873</p>
</li>

<li>
<p>NEC uPD72874</p>
</li>

<li>
<p>National Semiconductor CS4210</p>
</li>

<li>
<p>Ricoh R5C551</p>
</li>

<li>
<p>Ricoh R5C552</p>
</li>

<li>
<p>Sony CX3022</p>
</li>

<li>
<p>Sony i.LINK (CXD1947)</p>
</li>

<li>
<p>Sony i.LINK (CXD3222)</p>
</li>

<li>
<p>Sun PCIO-2 (RIO 1394)</p>
</li>

<li>
<p>Texas Instruments PCI4410A</p>
</li>

<li>
<p>Texas Instruments PCI4450</p>
</li>

<li>
<p>Texas Instruments PCI4451</p>
</li>

<li>
<p>Texas Instruments TSB12LV22</p>
</li>

<li>
<p>Texas Instruments TSB12LV23</p>
</li>

<li>
<p>Texas Instruments TSB12LV26</p>
</li>

<li>
<p>Texas Instruments TSB43AA22</p>
</li>

<li>
<p>Texas Instruments TSB43AB21/A/AI/A-EP</p>
</li>

<li>
<p>Texas Instruments TSB43AB22/A</p>
</li>

<li>
<p>Texas Instruments TSB43AB23</p>
</li>

<li>
<p>Texas Instruments TSB82AA2</p>
</li>

<li>
<p>VIA Fire II (VT6306)</p>
</li>
</ul>
</div>

<div class="SECT2">
<hr />
<h3 class="SECT2"><a id="BLUETOOTH" name="BLUETOOTH">3.14 Bluetooth Devices</a></h3>
</div>

<div class="SECT2">
<hr />
<h3 class="SECT2"><a id="CRYPTO-ACCEL" name="CRYPTO-ACCEL">3.15 Cryptographic
Accelerators</a></h3>
</div>

<div class="SECT2">
<hr />
<h3 class="SECT2"><a id="MISC" name="MISC">3.16 Miscellaneous</a></h3>

<p>Keyboards including:</p>

<ul>
<li>
<p>USB keyboards (<a
href="http://www.FreeBSD.org/cgi/man.cgi?query=ukbd&sektion=4&manpath=FreeBSD+6.1-RELEASE">
<span class="CITEREFENTRY"><span class="REFENTRYTITLE">ukbd</span>(4)</span></a>
driver)</p>
</li>
</ul>

<br />
<br />
<p>Pointing devices including:</p>

<ul>
<li>
<p>Serial mice and compatible devices</p>
</li>

<li>
<p>USB mice (<a
href="http://www.FreeBSD.org/cgi/man.cgi?query=ums&sektion=4&manpath=FreeBSD+6.1-RELEASE">
<span class="CITEREFENTRY"><span class="REFENTRYTITLE">ums</span>(4)</span></a>
driver)</p>
</li>
</ul>

<div class="NOTE">
<blockquote class="NOTE">
<p><b>Note:</b> <a
href="http://www.FreeBSD.org/cgi/man.cgi?query=moused&sektion=8&manpath=FreeBSD+6.1-RELEASE">
<span class="CITEREFENTRY"><span class="REFENTRYTITLE">moused</span>(8)</span></a> has
more information on using pointing devices with FreeBSD. Information on using pointing
devices with <b class="APPLICATION">Xorg</b> can be found at <a href="http://www.x.org/"
target="_top">http://www.x.org/</a>.</p>
</blockquote>
</div>

<br />
<br />
</div>
</div>
</div>

<hr />
<p align="center"><small>This file, and other release-related documents, can be
downloaded from <a
href="http://www.FreeBSD.org/snapshots/">http://www.FreeBSD.org/snapshots/</a>.</small></p>

<p align="center"><small>For questions about FreeBSD, read the <a
href="http://www.FreeBSD.org/docs.html">documentation</a> before contacting &#60;<a
href="mailto:questions@FreeBSD.org">questions@FreeBSD.org</a>&#62;.</small></p>

<p align="center"><small>For questions about this documentation, e-mail &#60;<a
href="mailto:doc@FreeBSD.org">doc@FreeBSD.org</a>&#62;.</small></p>
++++


